<template>
    <view class="content passwordpage">
        <uni-forms ref="form" :modelValue="formData" :rules="rules">
            <uni-forms-item label="原密码" name="oldpassword" style="margin: 20rpx 0;">
                <uni-easyinput type="password" v-model="formData.oldpassword" placeholder="请输入原来的密码" />
            </uni-forms-item>
			<uni-forms-item label="新密码" name="newpassword" style="border-bottom: 1px solid #eee;">
			    <uni-easyinput type="password" v-model="formData.newpassword" placeholder="请输入新密码" />
			</uni-forms-item>
			<uni-forms-item label="确认新密码" name="newpassword2">
			    <uni-easyinput type="password" v-model="formData.newpassword2" placeholder="请再次输入密码" />
			</uni-forms-item>
        </uni-forms>
		<view class="new_btn_bot">
			<button class="new_save_btn" @click="submit">确认修改</button>
		</view>
    </view>
</template>

<script>
	import { updateUserPwd } from '@/api/request2.js';
	export default {
	    data() {
	        return {
	            // 表单数据
	            formData: {
	                oldpassword: '',
	                newpassword: '',
					newpassword2:''
	            },
	            rules: {
					oldpassword: {
					    rules: [{
					            required: true,
					            errorMessage: '请输入密码',
					        }
					    ]
					},
	                // 对name字段进行必填验证
	                newpassword: {
	                    rules: [{
	                            required: true,
	                            errorMessage: '请输入密码',
	                        },
	                        {
	                            minLength: 6,
	                            maxLength: 20,
	                            errorMessage: '密码长度在 {minLength} 到 {maxLength} 个字符',
	                        }
	                    ]
	                },
	                // 对email字段进行必填验证
	                newpassword2: {
	                    rules: [{
	                            required: true,
	                            errorMessage: '请输入密码',
	                        },
	                        {
	                            minLength: 6,
	                            maxLength: 20,
	                            errorMessage: '密码长度在 {minLength} 到 {maxLength} 个字符',
	                        },
							{
								validateFunction:function(rule,value,data,callback){
									console.log(value !== data.newpassword)
									if (value !== data.newpassword) {
										callback('两次输入不同')
									}
									return true
								}
							}
	                    ]
	                }
	            }
	        }
	    },
	    methods: {
	        /**
	         * 复写 binddata 方法，如果只是为了校验，无复杂自定义操作，可忽略此方法
	         * @param {String} name 字段名称
	         * @param {String} value 表单域的值
	         */
	        // binddata(name,value){
	        // 通过 input 事件设置表单指定 name 的值
	        //   this.$refs.form.setValue(name, value)
	        // },
	        // 触发提交表单
	        submit() {
	            this.$refs.form.validate().then(res=>{
					console.log(res)
					updateUserPwd(res.oldpassword,res.newpassword).then((ress)=>{
						console.log('返回结果：', ress);
					})
	            }).catch(err =>{
	                console.log('表单错误信息：', err);
	            })
	        }
	    }
	}
</script>

<style>
	.content{
		/* padding: 20rpx; */
		/* background-color: #fff; */
	}
	
</style>
