<script>
	export default {
		onLaunch: function() {
			console.log('App Launch')
		},
		onShow: function() {
			// setInterval(function(){
			// 	uni.hideKeyboard()
			// },60)
			// console.log('App Show')
		},
		onHide: function() {
			// console.log('App Hide')
		}
	}
</script>

<style  lang="scss">
	/* 注意要写在第一行，同时给style标签加入lang="scss"属性 */
	/*每个页面公共css */
	@import "./uni_modules/vk-uview-ui/index.scss";
	// @import './common/PDA_style.css'; 
	@import './common/new_style.css';
    @import "./static/icon/iconfont.css";	
	@import './common/uni.css';
	@import './common/pdabasic.css';
    body{
        background-color: #EBEEF0;
    }
</style>
